Klikk på denne knappen for å tilbakestille alle innstillinger til verdiene som ble lagret sist.


Klikk på denne knappen for å tilbakestille alle innstillinger til fabrikkinnstillingene.


Klikk på rullepilen for å vise følgende kvalitetsalternativer for videovisning:

- Hvis du velger “Normal”, innstilles kvalitetsnivået for video på maksimal gjengivelseskvalitet.

- Hvis du velger “Høy”, innstilles kvalitetsnivået for video på maksimal visuell kvalitet. Denne innstillingen kan derimot redusere gjengivelseskvaliteten.

- Hvis du velger “Automatisk”, innstilles kvalitetsnivået for video automatisk for beste kombinasjon av visuell kvalitet og yteevne.


Bruk denne kontrollen til å justere mengden rød gamma.


Bruk denne kontrollen til å justere mengden grønn gamma.Bruk denne kontrollen til å justere mengden blå gamma.


Sett merke i denne boksen for å reservere 2 MB strukturminne til enhet for strukturtilordning i et Glide-program. Enkelte Glide-spill fungerer bare på riktig måte når dette alternativet er avmerket.


Sett merke i denne boksen for å aktivere tredobbel bufring der Glide-programmet har nok rammebufferminne til å støtte det. Dette kan forbedre gjengivelseskvaliteten. Enkelte programmer er derimot inkompatible med tredobbel bufring, og andre igjen kan utvise visuelle presentasjonsproblemer.


Sett merke i denne boksen for å deaktivere Glide splaskskjerm.


Sett merke i denne boksen for å aktivere mipmap-fargetilpasning for struktur. Dette kan medføre forbedret visuell kvalitet, men også en forverring av gjengivelseskvaliteten.


Sett merke i denne boksen for å framtvinge fjerning av kantobjekter i Direct3D. Dette kan medføre forbedret visuell kvalitet med liten eller ingen reduksjon i yteevne.


Sett merke i denne boksen for å aktivere overleggsmodus.


Sett merke i denne boksen for å tillate endringer i innstillinger for Glide/OpenGL.


Sett merke i denne boksen for å tillate endringer i innstillinger for Direct3D.


Sett merke i denne boksen for å tillate endringer i skrivebordsinnstillinger.


Rød gammaverdi.


Grønn gammaverdi.


Blå gammaverdi.


Klikk på rullepilen for å vise følgende kvalitetsalternativer for alfasammensetting:

- Hvis du velger “Jevnere”, blir resultatet en mykere bildekvalitet for alfasammensatt gjengivelse.

- Hvis du velger “Skarpere”, blir resultatet en mer detaljert bildekvalitet for alfasammensatt gjengivelse.

- Hvis du velger “Automatisk”, blir den alfasammensatte gjengivelseskvaliteten automatisk justert for beste totale bildekvalitet.


Sett merke i denne boksen for å kople sammen glidebryterne for rød, grønn og blå gamma.